Homework 1 Grade Distribution The average out of 59 students who turned in Assignment 1 is 54.1 out of 90, or 60.1 percent.

The full breakdown is as follows. ffl 1 scored 100 ffl 6 scored between 90 and 99 ffl 6 scored between 80 and 89 ffl 9 scored between 70 and 79 ffl 9 scored between 60 and 69 ffl 11 scored between 50 and 59 ffl 8 scored between 40 and 49 ffl 2 scored between 30 and 39 ffl 4 scored between 20 and 29 ffl 3 scored less than 10